% Loader
\newcommand{\load}[1]{
    \edef\recommended{recommended}
    \edef\minimal{minimal}
    \edef\most{most}
    \edef\full{full}
    \edef\letters{letter}
    \edef\temp{#1}
    \ifx \temp\recommended
        \typeout{[CustomLaTeXHelperLoader]: Loading config recommended}
        \input{\dir/scopes/recommended.tex}
        \loadRecommended
    \else
        \ifx \temp\minimal
            \typeout{[CustomLaTeXHelperLoader]: Loading config minimal}
            \input{\dir/scopes/minimal.tex}
            \loadMinimal
        \else
            \ifx \temp\most
                \typeout{[CustomLaTeXHelperLoader]: Loading config most}
                \input{\dir/scopes/most.tex}
                \loadMost
            \else
                \ifx \temp\full
                    \typeout{[CustomLaTeXHelperLoader]: Loading config full}
                    \input{\dir/scopes/full.tex}
                    \loadFull
                \else
                    \ifx \temp\letters
                        \typeout{[CustomLaTeXHelperLoader]: Loading config letter}
                        \input{\dir/scopes/minimal.tex}
                        \loadMinimal
                        \input{\dir/scopes/letter.tex}
                    \else
                        \typeout{[CustomLaTeXHelperLoader]: INVALID CONFIG SPECIFIED, NOTHING LOADED!}
                    \fi
                \fi
            \fi
        \fi
    \fi
}
